<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% Copyright (c) 2018-2019,2022 Casper Ti. Vector
% Public domain.

\documentclass[UTF8, zihao = -4]{ctexart}
\usepackage{calc, geometry, graphicx}
% 如须用 xelatex 编译，请参考 pkuthss.cls 修改字体设置。
\usepackage{textcomp, mathptmx}
\usepackage[scaled = 0.95]{helvet}
\pagestyle{empty}
\newlength{\colpad}
\newcommand{\colwidth}{0.99\ccwd}

% 设定论文纸尺寸。
\geometry{paperwidth = 460mm, paperheight = 297mm, margin = 0cm}
% 设定页面宽度、背面 logo 直径和书脊上下边界宽度。
\newcommand{\miniwidth}{210mm}
\newcommand{\logowidth}{64mm}
\newcommand{\vertmargin}{\fill}
% 减号前的值为论文厚度。
\setlength{\colpad}{(10mm - \colwidth) / 2}

\begin{document}
\centering
\begin{minipage}[b][\textheight][b]{\miniwidth}
	\vspace*{\fill}\par
	\centerline{\includegraphics[width = \logowidth]{pkulogo}}\par
	\vspace*{\fill}\par
\end{minipage}
\hspace{\colpad}
\begin{minipage}[b][\textheight][b]{\colwidth}
	\bfseries\linespread{1}\selectfont
	\vspace*{\vertmargin}\par
	% 标题、年份和学号。
	测试文档\par\vfill
	\rotatebox{-90}{2018}\par\vfill\rotatebox{-90}{0123456789}\par
	\vspace*{\vertmargin}\par
\end{minipage}
\hspace{\colpad}
\begin{minipage}[b][\textheight][b]{\miniwidth}
	% thesis.pdf 应事先编译好，此处会自动提取其首页。
	% 因为要插入 pdf 图片，本文档应用 pdflatex 编译。
	\includegraphics[height = \textheight, page = 1]{thesis}
\end{minipage}
\end{document}

% vim:ts=4:sw=4
</pre></body></html>