<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% This is the file example2.tex of the T2 package.

\input plainenc        % Load support for inputenc mechanism

\fontencoding{T2A}     % Load the T2A encoding definition file (t2aenc.def)
                       % One can use also other font encodings, e.g. LCY.

\font\larm=larm1000    % Set the default font --- Cyrillic
\larm                  % T2A encoded Computer Modern font.
% Note, that if you use e.g. lh* fonts (which have both Latin and
% Cyrillic glyphs), it's better to load these fonts in plain.tex instead
% of standard Computer Modern fonts.  in this case you'll not need to
% specify font names in your documents explicitly.

\inputencoding{koi8-r} % Set current input encoding to koi8-r.
                       % See the file cyrlatex.ins for a complete
                       % list of available input encodings.

Here goes some text in a koi8-r input encoding. ����� ����.

\inputencoding{cp866}  % Set current input encoding to cp~866.

Here goes some text in a cp~866 input encoding. �஡� ���.

\bye
</pre></body></html>